From 9abb88060e5bb6405e603dcbe499794e3e181040 Mon Sep 17 00:00:00 2001
From: Simon-Kor <52245124+Simon-Kor@users.noreply.github.com>
Date: Sun, 31 Mar 2024 18:57:17 +0200
Subject: Possible_Bug

In File test.tex line 51 could not be proven, error massage is in the new file error.txt
---
 latex/stdlib.tex | 1 +
 1 file changed, 1 insertion(+)

(limited to 'latex/stdlib.tex')

diff --git a/latex/stdlib.tex b/latex/stdlib.tex
index 3673801..4921363 100644
--- a/latex/stdlib.tex
+++ b/latex/stdlib.tex
@@ -43,4 +43,5 @@
     \input{../library/topology/topological-space.tex}
     \input{../library/topology/basis.tex}
     \input{../library/topology/disconnection.tex}
+    \input{../library/test.tex}
 \end{document}
-- 
cgit v1.2.3

